Quintiq file version 2.0
Component PanelCheckboxIsPlannedInfinite
{
  #keys: '[135040.0.218345665]'
  BaseType: 'WebPanel'
  Properties:
  [
    FixedSize: true
    Orientation: 'horizontal'
    Taborder: 2
  ]
}
