Quintiq file version 2.0
#parent: PanelCheckboxHasCapacitySmoothing/CheckBoxHasCapacitySmoothing
Response OnUserChanged () id:Response_PanelCheckboxHasCapacitySmoothing_CheckBoxHasCapacitySmoothing_OnUserChanged
{
  #keys: '[135040.0.232672383]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebCheckbox_OnUserChanged'
  QuillAction
  {
    Body:
    [*
      Form.UIEnableDisableComponent( false );
    *]
    GroupServerCalls: false
  }
}
