Quintiq file version 2.0
Component PanelMinLoadPercentage
{
  #keys: '[136682.1.1060503501]'
  BaseType: 'WebPanel'
  Children:
  [
    Component EditFieldMinLoadPercentage id:EditFieldMinLoadPercentage_646
    {
      #keys: '[136682.1.1060503618]'
      BaseType: 'WebEditField'
      Properties:
      [
        DataBinding: 'DataHolderDialogData.Data.MinimumLoadThreshold'
        Label: 'Min load percentage'
        Mask: 'REAL'
        Taborder: 1
        Tooltip: 'The minimum required utilization of the unit'
      ]
    }
    Component CheckBoxBatchEditMinimumLoadThreshold
    {
      #keys: '[136682.1.1065272133]'
      BaseType: 'WebCheckbox'
      Properties:
      [
        CheckboxType: 'toggle'
        ShowPadding: false
        Taborder: 0
      ]
    }
  ]
  Properties:
  [
    FixedSize: true
    Orientation: 'horizontal'
    Taborder: 0
  ]
}
