Quintiq file version 2.0
#parent: #root
Method InitializeComponents (
  OperationInputOutput selection
) id:Method_DialogEditOperationInputOutputs_InitializeComponents
{
  #keys: '[139394.0.1484119175]'
  Body:
  [*
    // Hide labels for system inputs outputs
    issystem := selection.IsSystem();
    
    LabelProduct.Visible( not issystem );
    LabelStockingPoint.Visible( not issystem );
    
    // Update labels with uom for non system
    uom := ' (' + selection.UnitUnitOfMeasurement().Name() + ')'
    EditFieldQuantity.Label( Translations::MP_WebDesigner_Quantity() + uom );
    
    if( selection.istype( OperationOutput ) )
    {
      this.Title( Translations::MP_WebDesigner_OutputQuantity() );
    }
  *]
}
