Quintiq file version 2.0
#parent: #root
Method InitializeComponents (
  OperationInput selection
) id:Method_DialogEditOperationInputsInInputGroups_InitializeComponents
{
  #keys: '[139394.0.1568961218]'
  Body:
  [*
    // Hide labels for system inputs outputs
    issystem := selection.IsSystem();
    
    LabelProduct.Visible( not issystem );
    LabelStockingPoint.Visible( not issystem );
    
    // Update labels with uom for non system
    if( not issystem )
    {
      uom := ' (' + selection.UnitUnitOfMeasurement().Name() + ')'
      EditFieldMinQuantity.Label( Translations::MP_WebDesigner_MinQuantity() + uom );
      EditFieldMaxQuantity.Label( Translations::MP_WebDesigner_MaxQuantity() + uom );
      EditFieldQuantity.Label( Translations::MP_WebDesigner_NominalQuantity() + uom );
    }
  *]
}
