Quintiq file version 2.0
Component PanelStockingPointUtilizationThreshold id:PanelStockingPointUtilizationThreshold_963
{
  #keys: '[139394.1.82538641]'
  BaseType: 'WebPanel'
  Children:
  [
    Component EditFieldStockingPointBottleneckThreshold
    {
      #keys: '[139394.1.82538642]'
      BaseType: 'WebEditField'
      Properties:
      [
        DataBinding: 'DataHolderDialogData.Data.StockingPointBottleneckThreshold'
        Label: 'Bottleneck threshold (%)'
        Mask: 'REAL'
        Taborder: 0
        Tooltip: 'Stocking point periods with utilization higher than the bottleneck threshold are marked as bottleneck.'
      ]
    }
  ]
  Properties:
  [
    Taborder: 1
    Title: 'Stocking point utilization threshold'
  ]
}
