Quintiq file version 2.0
Component PanelUnitUtilizationThresholds id:PanelUnitUtilizationThresholds_57
{
  #keys: '[139394.1.82538606]'
  BaseType: 'WebPanel'
  Children:
  [
    Component EditFieldLowerBottleneckThreshold
    {
      #keys: '[139394.1.82538607]'
      BaseType: 'WebEditField'
      Properties:
      [
        DataBinding: 'DataHolderDialogData.Data.UnitLowerBottleneckThreshold'
        Label: 'Bottleneck threshold (%)'
        Mask: 'REAL'
        Taborder: 0
        Tooltip: 'Unit periods with utilization higher than the bottleneck threshold are marked as bottleneck and shown in yellow in the Capacity planning chart.'
      ]
    }
    Component EditFieldUpperBottleneckThreshold
    {
      #keys: '[139394.1.82538608]'
      BaseType: 'WebEditField'
      Properties:
      [
        DataBinding: 'DataHolderDialogData.Data.UnitUpperBottleneckThreshold'
        Label: 'Overload threshold (%)'
        Mask: 'REAL'
        Taborder: 1
        Tooltip: 'Unit periods with utilization higher than the overload threshold are shown in orange in the Capacity planning chart.'
      ]
    }
  ]
  Properties:
  [
    Taborder: 0
    Title: 'Unit utilization thresholds'
  ]
}
