Quintiq file version 2.0
#parent: PanelTimeCapacities/DropDownListDefaultShiftPattern
Response OnApplyData () id:Response_PanelTimeCapacities_DropDownListDefaultShiftPattern_OnApplyData
{
  #keys: '[144528.1.990988839]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebComponent_OnApplyData'
  QuillAction
  {
    Body:
    [*
      // Set the default shift pattern name to global parameters before ApplyChanges is called
      // This attribute is used to declarative calculate the default shift pattern relation from MacroPlan
      applydata.AddAttribute( MacroPlan.GlobalParameters_MP(), 
                              attribute( GlobalParameters_MP, DefaultShiftPatternName ), 
                              DropDownListDefaultShiftPattern.Data().Name() );
    *]
    GroupServerCalls: false
  }
}
