Quintiq file version 2.0
#parent: CustomDrawRC/CustomDrawDataLayerOperationInput
Response OnDrop (
  StockingPoint_MP source,
  OperationInput target
) id:Response_CustomDrawRC_CustomDrawDataLayerOperationInput_OnDrop_545
{
  #keys: '[139394.0.1321253960]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebCustomDrawDataLayer_OnDrop'
  QuillAction
  {
    Body:
    [*
      // Swap the existing SP of PISP with the new SP.
      target.AssignToStockingPoint( source );
    *]
    GroupServerCalls: false
  }
}
