Quintiq file version 2.0
#parent: CustomDrawRC/CustomDrawDataLayerOperationOutput
Response OnDrop (
  StockingPoint_MP source,
  OperationOutput target
) id:Response_CustomDrawRC_CustomDrawDataLayerOperationOutput_OnDrop
{
  #keys: '[139394.0.1321254917]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebCustomDrawDataLayer_OnDrop'
  QuillAction
  {
    Body:
    [*
      // Swap the existing SP of PISP with the new SP.
      target.AssignToStockingPoint( source );
    *]
    GroupServerCalls: false
  }
}
