Quintiq file version 2.0
#parent: ListUnitTree
Response OnCreated () id:Response_ListUnitTree_OnCreated_360
{
  #keys: '[113694.2.1043486068]'
  Body:
  [*
    // Work around on quintiq bug, the DataHolder on datachange is fired while the list is not completly loaded.
    this.UserData( 1 );
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIComponent_OnCreated'
}
