Quintiq file version 2.0
#parent: DataHolderSCVSelection
Response OnDataChanged () id:Response_FormSupplyPlanning_DataHolderSCVSelection_OnDataChanged
{
  #keys: '[137862.0.631617169]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebComponent_OnDataChanged'
  GroupServerCalls: true
  Precondition:
  [*
    not isnull( MacroPlan )
  *]
  QuillAction
  {
    Body:
    [*
      //Populate matrix row upon changes of PISP
      
      processes := selectset( MacroPlan, Unit.Process_MP, p, p.IsVisibleOnPlanningMatrix( this.Data() ) );
      
      DataHolderProcess.Data( &processes )
      FormSupplyPlanning.GeneratePlanningMatrixData();
    *]
  }
}
