Quintiq file version 2.0
#parent: GanttChartDemandSupplyGroup/MenuShowSystemUserInfo
Response OnReadView () id:Response_GanttChartDemandSupplyGroup_MenuShowSystemUserInfo_OnReadView
{
  #keys: '[113694.0.2063818099]'
  Body:
  [*
    // Read data
    this.Checked( [Boolean]viewdata.Data() );
    Form.UpdateSystemConfigurableInformation();
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIComponent_OnReadView'
}
