Quintiq file version 2.0
#parent: #root
Method PTF_GUITimerResume () id:Method_LibPTF_pnlTestRunner_PTF_GUITimerResume
{
  #keys: '[105690.0.894036516]'
  Body:
  [*
    // Resume the GUITimer
    if( vhPTFExecutionStatus.Value() = LibPTF::ExecStatusWaiting() )
    {
      gtPTF.Enabled( true );
      this.PTF_SetCurrentExecutionStatus( LibPTF::ExecStatusRunning() );
    }
  *]
}
