Quintiq file version 2.0
#root
#parent: LibMacroPlannerTCUI
OrphanComponent DialogCreateEditUnitOfMeasure
{
  #keys: '[11660.0.257210321]'
  Accessibility: 'Extensible'
  BaseType: 'Dialog'
  Databinding: 'UnitOfMeasure_MP'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 5 parent: 0 }
      GBFlow.Column { grow: 128 id: 9 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => EditorName
        Position { startcolumn: 9 startrow: 1 endcolumn: 9 endrow: 1 }
      }
      GBElement
      {
        Component => LabelName
        Position { startcolumn: 5 startrow: 1 endcolumn: 5 endrow: 1 }
      }
    ]
    Gaps: [ left: 10 right: 10 top: 10 bottom: 10 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 1 parent: 0 }
    ]
  }
  Children:
  [
    Component LabelName
    {
      #keys: '[11660.0.257210396]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'EditorName'
        NumberLines: 1
        Shortcut: 'Alt+N'
        SizePosition: 'lt10 44 30 46'
        Text: '&Name'
        Tooltip: 'When the conversion factor is not defined, a default factor of 1 will be used.'
      ]
    }
    #child: EditorName
    #child: Toolbar
  ]
  Properties:
  [
    EnterButton: 'btnOk'
    EscapeButton: 'btnCancel'
    Height: 108
    InitialPlacement: 'floating'
    ResizeStrategy: 'horizontal'
    Title: 'Unit of measurement'
    Width: 407
    ModeledStringList ChildOrdering
    {
      c: EditorName
      c: LabelName
      c: Toolbar
    }
  ]
}
