Quintiq file version 2.0
#parent: #root
Method SetDefaultStartAndEnd () id:Method_DialogGenerateBaseReport_SetDefaultStartAndEnd
{
  #keys: '[110880.6.1452633736]'
  Body:
  [*
    // Set default planning start and end
    
    GUIDateTimeSelectorStart.DateTime( MacroPlan.Start() ) ;
    GUIDateTimeSelectorEnd.DateTime( MacroPlan.End() );
  *]
}
