Quintiq file version 2.0
Component PanelFeedbackLocked id:PanelFeedbackLocked_791
{
  #keys: '[146140.0.361392444]'
  BaseType: 'WebPanel'
  Children:
  [
    Component ColorSelectorFeedbackLocked
    {
      #keys: '[146140.0.361392445]'
      BaseType: 'WebColorSelector'
      Properties:
      [
        Color: ''
        Enabled: false
        Taborder: 0
      ]
    }
    Component LabelFeedbackLocked
    {
      #keys: '[146140.0.361392446]'
      BaseType: 'WebLabel'
      Properties:
      [
        FixedSize: false
        Taborder: 1
        Text: 'Feedback is locked. Optimizer must plan the fixed quantity. '
      ]
    }
  ]
  Properties:
  [
    FixedSize: true
    Orientation: 'horizontal'
    Taborder: 1
  ]
}
