Quintiq file version 2.0
#parent: TabPageGeneral/CheckBoxIsOverrideUnitOfMeasurementForProduct
Response OnUserChange () id:Response_TabPageGeneral_CheckBoxIsOverrideUnitOfMeasurementForProduct_OnUserChange
{
  #keys: '[124808.2.555260226]'
  Body:
  [*
    // Enable / disable components
    Dialog.EnableDisableComponents();
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_CheckBox_OnUserChange'
}
