Quintiq file version 2.0
#parent: Toolbar/btnOk
Response OnClick () id:Response_Toolbar_btnOk_OnClick
{
  #keys: '[11660.0.763174232]'
  Body:
  [*
    // Apply changes
    Dialog.ApplyChanges();
    Dialog.EndModal(1);
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIButtonBase_OnClick'
  Precondition:
  [*
    sanitycheckfeedback := '';
    return InventorySpecification::ValidateInput( feedback,
                                                  sanitycheckfeedback,
                                                  SelectionProduct.Data(),
                                                  SelectionStockingPoint.Data(),
                                                  GUIStartDateTimeSelector.DateTime().Date(),
                                                  [Boolean] RadioButtonGroupMinLevel.BoundValue(),
                                                  ApplicationLibMacroPlanner.FormatStringToReal( EditorMinLevelInDays.Text() ),
                                                  ApplicationLibMacroPlanner.FormatStringToReal( EditorMinLevelInQuantity.Text() ),
                                                  CheckBoxHasMaxLevel.Checked(),
                                                  [Boolean] RadioButtonGroupMaxLevel.BoundValue(),
                                                  ApplicationLibMacroPlanner.FormatStringToReal( EditorMaxLevelInDays.Text() ),
                                                  ApplicationLibMacroPlanner.FormatStringToReal( EditorMaxLevelInQuantity.Text() ),
                                                  Dialog.Data().WrappedInstance(),
                                                  true );
  *]
  UserRequiresReadWrite: true
}
