Quintiq file version 2.0
#root
#parent: LibOpt_BTDesktop
OrphanComponent DialogModelSettings
{
  #keys: '[139544.0.947662590]'
  BaseType: 'Dialog'
  Databinding: 'shadow[LibOpt_BT_TrackingTableBase]'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 152 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => GroupPanel572
        Position { startcolumn: 152 startrow: 920 endcolumn: 152 endrow: 920 }
      }
      GBElement
      {
        Component => GroupPanel989
        Position { startcolumn: 152 startrow: 489 endcolumn: 152 endrow: 489 }
      }
    ]
    Gaps: [ left: 10 right: 10 top: 10 bottom: 10 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 920 parent: 0 }
      GBFlow.Row { grow: 128 id: 489 parent: 0 }
    ]
  }
  Children:
  [
    #child: Toolbar408
    #child: GroupPanel572
    #child: GroupPanel989
  ]
  Properties:
  [
    EnterButton: 'btnOk'
    EscapeButton: 'btnCancel'
    Height: 349
    Title: 'Model settings'
    Width: 413
    ModeledStringList ChildOrdering
    {
      c: Toolbar408
      c: GroupPanel572
      c: GroupPanel989
    }
  ]
}
