Quintiq file version 2.0
#parent: CustomDrawComponentRoutingConfigurator/CustomDrawDataLayerPISPNodeInRoutingRCV
Response OnDrop (
  StockingPoint_MP source,
  PISPNodeInRouting droptarget
) id:Response_CustomDrawComponentRoutingConfigurator_CustomDrawDataLayerPISPNodeInRoutingRCV_OnDrop_240
{
  #keys: '[113694.2.106514392]'
  Body:
  [*
    // Drop stocking point on floating product.
    // Assign a floating product to a stocking point to complete the assignment of a PISP to a routing.
    // SP would also be assigned as input and/or output SP depending on the floating product.
    droptarget.AssignToStockingPoint( source );
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_CustomDrawDataLayer_OnDrop'
  Precondition:
  [*
    return droptarget.CanAssignToStockingPoint( source, feedback );
  *]
}
