Quintiq file version 2.0
#root
#parent: LibMacroPlannerWebUI
OrphanComponent BaseGauge
{
  #keys: '[137818.0.540010557]'
  Accessibility: 'Extensible'
  BaseType: 'WebGauge'
  Children:
  [
    Component DataExtractorBaseGauge
    {
      #keys: '[137818.0.540010298]'
      BaseType: 'WebDataExtractor'
      Properties:
      [
        DataType: 'Scenario'
        Source: 'ApplicationMacroPlanner.DataHolderActiveScenario'
        Taborder: 0
        Transformation: 'KPIValue'
      ]
    }
  ]
  Properties:
  [
    BackgroundColor: '$80C784'
    DataPath: 'object.GetDisplayValue() / object.KPI().KPISetting().Precision()'
    HighThreshold: 'object.KPI().KPISetting().HighThreshold() / object.KPI().KPISetting().Precision()'
    HighThresholdColor: '$F05350'
    Max: 'object.KPI().KPISetting().MaxValue() / object.KPI().KPISetting().Precision()'
    MediumThreshold: 'object.KPI().KPISetting().MediumThreshold() / object.KPI().KPISetting().Precision()'
    MediumThresholdColor: '$FFB74D'
    Min: 'object.KPI().KPISetting().MinValue() / object.KPI().KPISetting().Precision()'
    Precision: 'object.KPI().KPISetting().Decimals()'
    ReverseThreshold: 'object.KPI().IsMaximize()'
    Taborder: 0
    Title: 'object.KPI().Name()'
    Units: 'object.KPI().KPISetting().Unit()'
  ]
}
