Quintiq file version 2.0
#root
#parent: DistributedServiceProvider
OrphanComponent DSP_ControlPanel
{
  #keys: '[121072.0.241056911]'
  BaseType: 'Panel'
  GBLayout
  {
    Type: 'GBLayoutDefinition'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 834 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => Label
        Position { startcolumn: 834 startrow: 278 endcolumn: 834 endrow: 278 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 278 parent: 0 }
    ]
  }
  Children:
  [
    Component ValueHolderHasSyncError
    {
      #keys: '[121072.0.241057783]'
      BaseType: 'ValueHolder'
      Properties:
      [
        DataBinding: 'SWF_CommunicationDataset.DistributedServiceProvider.LastSyncErrorMessage'
        PosX: 40
      ]
    }
    Component Label
    {
      #keys: '[121072.0.241196403]'
      BaseType: 'Label'
      Properties:
      [
        Text: 'DSP Panel'
        Transparent: true
      ]
    }
  ]
  Properties:
  [
    Border: true
    ModeledStringList ChildOrdering
    {
      c: ValueHolderHasSyncError
      c: Label
    }
  ]
}
