Quintiq file version 2.0
Component PanelTestController
{
  #keys: '[136682.0.314386071]'
  BaseType => //LibPTF_pnlTestController
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 23 parent: 23 }
      GBFlow.Column { grow: 0 id: 37 parent: 37 }
      GBFlow.Column { grow: 0 id: 4 parent: 4 }
      GBFlow.Column { grow: 0 id: 5 parent: 5 }
      GBFlow.Column { grow: 0 id: 6 parent: 6 }
      GBFlow.Column { grow: 0 id: 7 parent: 7 }
      GBFlow.Column { grow: 32 id: 38 parent: 38 }
      GBFlow.Column { grow: 0 id: 67 parent: 67 }
      GBFlow.Column { grow: 0 id: 195 parent: 195 }
      GBFlow.Column { grow: 0 id: 626 parent: 626 }
      GBFlow.Column { grow: 128 id: 2 parent: 2 }
      GBFlow.Column { grow: 0 id: 186 parent: 186 }
      GBFlow.Column { grow: 0 id: 73 parent: 73 }
      GBFlow.Column { grow: 0 id: 74 parent: 74 }
      GBFlow.Column { grow: 0 id: 71 parent: 71 }
      GBFlow.Column { grow: 0 id: 13 parent: 13 }
    ]
    Elements:
    [
      GBElement
      {
        Component => //LibPTF_pnlTestController/lstExecutionTestScript
        Position { startcolumn: 23 startrow: 2 endcolumn: 13 endrow: 2 }
      }
      GBElement
      {
        Component => //LibPTF_pnlTestController/lblStartTime
        Position { startcolumn: 37 startrow: 1 endcolumn: 37 endrow: 1 }
      }
      GBElement
      {
        Component => //LibPTF_pnlTestController/lblEndTimeLabel
        Position { startcolumn: 4 startrow: 1 endcolumn: 4 endrow: 1 }
      }
      GBElement
      {
        Component => //LibPTF_pnlTestController/lblEndTime
        Position { startcolumn: 5 startrow: 1 endcolumn: 5 endrow: 1 }
      }
      GBElement
      {
        Component => //LibPTF_pnlTestController/lblDurationLabel
        Position { startcolumn: 6 startrow: 1 endcolumn: 6 endrow: 1 }
      }
      GBElement
      {
        Component => //LibPTF_pnlTestController/lblDurationTime
        Position { startcolumn: 7 startrow: 1 endcolumn: 7 endrow: 1 }
      }
      GBElement
      {
        Component => //LibPTF_pnlTestController/edtSharedRepository
        Position { startcolumn: 4 startrow: 3 endcolumn: 38 endrow: 3 }
      }
      GBElement
      {
        Component => //LibPTF_pnlTestController/lblSharedRepository
        Position { startcolumn: 23 startrow: 3 endcolumn: 37 endrow: 3 }
      }
      GBElement
      {
        Component => //LibPTF_pnlTestController/btnStop
        Position { startcolumn: 13 startrow: 1 endcolumn: 13 endrow: 1 }
      }
      GBElement
      {
        Component => //LibPTF_pnlTestController/imgSharedRepository
        Position { startcolumn: 67 startrow: 3 endcolumn: 67 endrow: 3 }
      }
      GBElement
      {
        Component => //LibPTF_pnlTestController/lblStartTimeLabel
        Position { startcolumn: 23 startrow: 1 endcolumn: 23 endrow: 1 }
      }
      GBElement
      {
        Component => //LibPTF_pnlTestController/imgCopyQuintiqLogs
        Position { startcolumn: 13 startrow: 3 endcolumn: 13 endrow: 3 }
      }
      GBElement
      {
        Component => //LibPTF_pnlTestController/chkCopyQTransLogs
        Position { startcolumn: 71 startrow: 3 endcolumn: 71 endrow: 3 }
      }
      GBElement
      {
        Component => //LibPTF_pnlTestController/chkExecutePythonScripts
        Position { startcolumn: 186 startrow: 3 endcolumn: 186 endrow: 3 }
      }
      GBElement
      {
        Component => //LibPTF_pnlTestController/imgExecutePythonScripts
        Position { startcolumn: 73 startrow: 3 endcolumn: 73 endrow: 3 }
      }
      GBElement
      {
        Component => //LibPTF_pnlTestController/lblSpacing
        Position { startcolumn: 74 startrow: 3 endcolumn: 74 endrow: 3 }
      }
      GBElement
      {
        Component => //LibPTF_pnlTestController/lblLastClientTimeZone
        Position { startcolumn: 195 startrow: 1 endcolumn: 195 endrow: 1 }
      }
      GBElement
      {
        Component => //LibPTF_pnlTestController/lblClientTimezoneOffset
        Position { startcolumn: 626 startrow: 1 endcolumn: 626 endrow: 1 }
      }
      GBElement
      {
        Component => lblLastTestStartTime
        Position { startcolumn: 67 startrow: 1 endcolumn: 67 endrow: 1 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 1 parent: 1 }
      GBFlow.Row { grow: 128 id: 2 parent: 2 }
      GBFlow.Row { grow: 0 id: 3 parent: 3 }
    ]
  }
  Children:
  [
    Component lblLastTestStartTime
    {
      #keys: '[131464.1.896620292]'
      BaseType => //LibPTF_pnlTestController/lblLastTestStartTime
      IsDerived: true
      Properties:
      [
        DataBinding: 'ScenarioManager.PTF.LastTestStartTime'
      ]
    }
  ]
}
