Quintiq file version 2.0
#root
#parent: LibMacroPlannerTCUI
OrphanComponent DialogShowProcessDependency
{
  #keys: '[110880.6.1818086489]'
  Accessibility: 'Extensible'
  BaseType: 'Dialog'
  Databinding: 'structured[Process_MP]*'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 2 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => ListProcess_MP
        Position { startcolumn: 2 startrow: 2 endcolumn: 2 endrow: 2 }
      }
    ]
    Gaps: [ left: 10 right: 10 top: 10 bottom: 10 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 2 parent: 0 }
    ]
  }
  Children:
  [
    #child: Toolbar
    #child: ListProcess_MP
  ]
  Properties:
  [
    EnterButton: 'btnOk'
    EscapeButton: 'btnCancel'
    Height: 476
    IncludeInView: true
    InitialPlacement: 'floating'
    Title: 'Upstream processes'
    Width: 510
    ModeledStringList ChildOrdering
    {
      c: Toolbar
      c: ListProcess_MP
    }
  ]
}
