Quintiq file version 2.0
#parent: EditorLotSizeTolerance
Response OnInputIdle () id:Response_EditorLotSizeTolerance_OnInputIdle
{
  #keys: '[132444.0.50605553]'
  Body:
  [*
    // We need to ApplyChanges everytime the user changes the value because the Ok button
    // precondition check now uses the shadow object Dialog.Data.LotSizeTolerance
    // The reason the preconditionn check uses the shadow object is because it was using
    // UI text to do precondition checking, and it made hidden UI gave unnecessary errors
    this.ApplyChanges();
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_Editor_OnInputIdle'
}
