Quintiq file version 2.0
#parent: CustomDrawComponentContainer/GUITimer935
Response OnTimer () id:Response_CustomDrawComponentContainer_GUITimer935_OnTimer
{
  #keys: '[139164.4.339794228]'
  Body:
  [*
    if( Form.CustomDrawComponentContainer().Width() <> 0
        and Form.CustomDrawComponentContainer().Height() <> 0 )
    {
      this.Enabled( false );
      Form.PositionMinimap();
    }
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUITimer_OnTimer'
}
