Quintiq file version 2.0
#parent: DataHolderSelectedSalesSegment
Response OnDataChanged () id:Response_ListSalesSegment_DataHolderSelectedSalesSegment_OnDataChanged
{
  #keys: '[113694.2.1043713613]'
  Body:
  [*
    // Syncrhonize the list selection
    ApplicationLibMacroPlanner.AutoExpandSelection( ListSalesSegment, this.Data() );
    ApplicationLibMacroPlanner.AutoSelectElementsInList( ListSalesSegment, this.Data() );
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIComponent_OnDataChanged'
  Precondition:
  [*
    return ListSalesSegment.UserData() = 1 // Work around on quintiq bug, the DataHolder on datachange is fired while the list is not completly loaded.
           and not isnull( this.Data() )
           and this.Data().Size() > 0;
  *]
}
