Quintiq file version 2.0
#root
#parent: LibOpt_BTDesktop
OrphanComponent FormRows
{
  #keys: '[138586.1.499626827]'
  BaseType => /FormTrackingTableBase
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 303 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => ListLibOpt_BT_TrackingTableRow
        Position { startcolumn: 303 startrow: 469 endcolumn: 303 endrow: 469 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 469 parent: 0 }
    ]
  }
  Children:
  [
    #child: ListLibOpt_BT_TrackingTableRow
  ]
  Properties:
  [
    Height: 300
    Image: 'ROW'
    IncludeInView: true
    Title: 'Rows'
    Width: 336
  ]
}
