Quintiq file version 2.0
#parent: Toolbar/ButtonOk
Response OnClick () id:Response_Toolbar_ButtonOk_OnClick
{
  #keys: '[11660.0.25978397]'
  Body:
  [*
    // Apply changes
    Dialog.ApplyChanges();
    Dialog.EndModal(1);
  *]
  DefinitionID: 'Responsedef_GUIButtonBase_OnClick'
  Precondition:
  [*
    sanitycheckfeedback := '';                                     
    
    //if user can't see shelf life related attributes, pass in a defalut value
    manufactureddate := Dialog.GetManufacturedDateWithUIRestriction( GUIDateTimeSelectorManufacturedDate.DateTime().Date(), GUIDateTimeSelectorDate.DateTime().Date() );
    return InventorySupply::ValidateInput( feedback,
                                           sanitycheckfeedback,
                                           MacroPlan,
                                           SelectionProduct.Data(),
                                           SelectionStockingPoint.Data(),
                                           ApplicationLibMacroPlanner.FormatStringToReal( EditorQuantity.Text() ),
                                           GUIDateTimeSelectorDate.DateTime().Date(),
                                           manufactureddate );
  *]
}
