Quintiq file version 2.0
#parent: PanelModule116/bPullCapacityAllocationRule
Response OnClick () id:Response_PanelModule116_bPullCapacityAllocationRule_OnClick
{
  #keys: '[414702.1.433723161]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebButton_OnClick'
  QuillAction
  {
    Body:
    [*
      //ModulePanelCorrespondence::PullCapacityAllocationRule( GlobalOTDSOP );
    *]
    GroupServerCalls: false
  }
}
