Quintiq file version 2.0
#root
#parent: DataExchangeFramework
OrphanComponent LibDEF_DialogEditIntegrationEventCleanupDaemon
{
  #keys: '[122752.0.507482651]'
  BaseType: 'Dialog'
  Databinding: 'LibDEF_DataBroker'
  GBLayout
  {
    Type: 'GBLayoutDefinition'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 1 parent: 0 }
      GBFlow.Column { grow: 128 id: 2 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => chkEnableDaemon
        Position { startcolumn: 1 startrow: 1 endcolumn: 1 endrow: 1 }
      }
      GBElement
      {
        Component => pnlIntegrationEventDeletionDaemon
        Position { startcolumn: 1 startrow: 3 endcolumn: 2 endrow: 3 }
      }
    ]
    Gaps: [ left: 10 right: 10 top: 10 bottom: 10 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 1 parent: 0 }
      GBFlow.Row { grow: 0 id: 3 parent: 0 }
    ]
  }
  Children:
  [
    #child: Toolbar
    Component chkEnableDaemon
    {
      #keys: '[116086.0.427131964]'
      BaseType: 'CheckBox'
      Properties:
      [
        DataBinding: 'Dialog.Data.DMGlobalParameter.IsDaemonCleanupIntegrationEventsEnabled'
        Shortcut: 'Alt+E'
        Text: '&Enable automatic event clean-up'
      ]
    }
    #child: pnlIntegrationEventDeletionDaemon
  ]
  Properties:
  [
    EnterButton: 'btnOk'
    EscapeButton: 'btnCancel'
    Height: 190
    InitialPlacement: 'floating'
    ResizeStrategy: 'fixed-size'
    Title: 'Configure automatic event clean-up'
    Width: 445
    ModeledStringList ChildOrdering
    {
      c: chkEnableDaemon
      c: pnlIntegrationEventDeletionDaemon
      c: Toolbar
    }
  ]
}
