Quintiq file version 2.0
#root
#parent: LibMacroPlannerTCUI
OrphanComponent dlgEnvironment
{
  #keys: '[110880.5.1617453569]'
  BaseType: 'Dialog'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 1 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => chkDebug
        Position { startcolumn: 1 startrow: 1 endcolumn: 1 endrow: 1 }
      }
      GBElement
      {
        Component => chkDebuginfo
        Position { startcolumn: 1 startrow: 2 endcolumn: 1 endrow: 2 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 1 parent: 0 }
      GBFlow.Row { grow: 0 id: 2 parent: 0 }
    ]
  }
  Children:
  [
    Component chkDebug
    {
      #keys: '[10278.1.95537355]'
      BaseType: 'CheckBox'
      Properties:
      [
        SizePosition: 'lt13 246 12 28'
        Text: 'debug (Run in debugmode: enables asserts)'
      ]
    }
    Component chkDebuginfo
    {
      #keys: '[10278.1.95537356]'
      BaseType: 'CheckBox'
      Properties:
      [
        SizePosition: 'lt13 237 35 51'
        Text: 'debuginfo (DebugInfo statements enabled)'
      ]
    }
    #child: Toolbar
  ]
  Properties:
  [
    EscapeButton: 'btnOK'
    Height: 105
    InitialPlacement: 'floating'
    Title: 'Environment'
    Width: 253
    ModeledStringList ChildOrdering
    {
      c: chkDebug
      c: chkDebuginfo
      c: Toolbar
    }
  ]
}
