Quintiq file version 2.0
#root
#parent: LibOpt_BTDesktop
OrphanComponent DialogRunSequence
{
  #keys: '[138586.1.488228890]'
  BaseType: 'Dialog'
  Databinding: 'shadow[LibOpt_BT_RunSequence]'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 959 parent: 0 }
      GBFlow.Column { grow: 0 id: 730 parent: 0 }
      GBFlow.Column { grow: 128 id: 376 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => Label396
        Position { startcolumn: 959 startrow: 231 endcolumn: 959 endrow: 231 }
      }
      GBElement
      {
        Component => EditorName
        Position { startcolumn: 730 startrow: 231 endcolumn: 376 endrow: 231 }
      }
      GBElement
      {
        Component => CheckBox854
        Position { startcolumn: 730 startrow: 527 endcolumn: 730 endrow: 527 }
      }
    ]
    Gaps: [ left: 10 right: 10 top: 10 bottom: 10 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 231 parent: 0 }
      GBFlow.Row { grow: 0 id: 527 parent: 0 }
    ]
  }
  Children:
  [
    #child: EditorName
    Component Label396
    {
      #keys: '[138586.1.488228894]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        Text: 'Name'
        Transparent: true
      ]
    }
    #child: Toolbar671
    Component CheckBox854
    {
      #keys: '[138586.1.494980653]'
      BaseType: 'CheckBox'
      Properties:
      [
        DataBinding: 'DialogRunSequence.Data.StopOnFailure'
        Text: 'Stop running when one fails'
      ]
    }
  ]
  Properties:
  [
    EnterButton: 'btnOk'
    EscapeButton: 'btnCancel'
    Height: 128
    Title: 'Run Sequence'
    Width: 254
    ModeledStringList ChildOrdering
    {
      c: EditorName
      c: Label396
      c: Toolbar671
      c: CheckBox854
    }
  ]
}
