Quintiq file version 2.0
#parent: #root
Response OnClick () id:Response_SCK_ButtonSanityCheckBase_OnClick
{
  #keys: '[132254.0.10954521]'
  Body:
  [*
    // Open sanity check form
    panel := this.GetPanelSanityCheck();
    panel.OpenSanityCheckDialog();
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIButtonBase_OnClick'
}
