Quintiq file version 2.0
#parent: ToolbarMain/ValueHolderSanityCheckHighestSeverityMsgCount
Response OnValueChanged () id:Response_ToolbarMain_ValueHolderSanityCheckHighestSeverityMsgCount_OnValueChanged
{
  #keys: '[112884.1.706808273]'
  Body:
  [*
    // Update the summary status text
    text := '';
    
    if( guard( [Number]this.Value(), -1 ) <> 0 )
    {
      text := this.Value();
    }
    
    ButtonDoSanityCheck.SetProperty( 'Text', text );
    
    ApplicationLibMacroPlanner.UpdateOptimizerRunButton();
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_ValueHolder_OnValueChanged'
  Precondition:
  [*
    return MacroPlan::HasMacroPlan( MacroPlan, feedback );
  *]
}
