Quintiq file version 2.0
#parent: #root
Method PTF_RefreshDurationSelectorState () id:Method_LibPTF_dlgCreateEditTestScript_PTF_RefreshDurationSelectorState
{
  #keys: '[104342.0.753354191]'
  Body:
  [*
    // Refresh the GUIDurationSelectors "states"
    this.PTF_SetDurationSelectorState( this.durOffset() );
    this.PTF_SetDurationSelectorState( this.durMinStartClientDelay() );
    this.PTF_SetDurationSelectorState( this.durMaxStartClientDelay() );
  *]
}
