Quintiq file version 2.0
#parent: pnlCheckBoxOffset/chkOffset
Response OnUserChange () id:Response_pnlCheckBoxOffset_chkOffset_OnUserChange
{
  #keys: '[104342.0.769811122]'
  Body:
  [*
    // Toggle state of the associated UI components
    enabled := chkOffset.Checked();
    
    durOffset.Enabled( enabled );
    
    Dialog.PTF_SetDurationSelectorState( durOffset );
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_CheckBox_OnUserChange'
}
