Quintiq file version 2.0
#parent: chkExecutePythonScripts
Response OnCreated () id:Response_LibPTF_pnlTestController_chkExecutePythonScripts_OnCreated
{
  #keys: '[110852.0.902224478]'
  Body:
  [*
    // Retrieve initial value
    this.Checked( LibPTF_pnlTestController.PTF_GetPTFGlobalParameters().DoExecutePythonScripts() );
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIComponent_OnCreated'
  Precondition:
  [*
    return LibPTF_pnlTestController.PTF_HasDatasetPTF( feedback );
  *]
}
