Quintiq file version 2.0
#parent: #root
Method PTF_GUITimerStart () id:Method_LibPTF_pnlTestRunner_PTF_GUITimerStart
{
  #keys: '[105690.0.894041214]'
  Body:
  [*
    // Start the GUITimer
    gtPTF.Interval( this.PTF_GetMinTimerInterval() );
    gtPTF.Enabled( true );
    this.PTF_SetCurrentExecutionStatus( LibPTF::ExecStatusRunning() );
  *]
}
