Quintiq file version 2.0
#parent: PanelGeneral/DropDownListUnit
Response OnSelectionChanged (
  Unit selection
) id:Response_PanelGeneral_DropDownListUnit_OnSelectionChanged
{
  #keys: '[150660.0.919488930]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebDropDownList_OnSelectionChanged'
  QuillAction
  {
    Body:
    [*
      // RFC: CTAS-46202 Disabled WebCheckbox is resetted to enable after show form
      // Workaround: recall enable/disable logic.
      Form.OnUserUpdateUI( selection );
    *]
    GroupServerCalls: false
  }
}
