Quintiq file version 2.0
#parent: PanelStockingCost/DropDownListStockingPoint
Response OnUserSelectionChanged (
  StockingPoint_MP selection
) id:Response_PanelStockingCost_DropDownListStockingPoint_OnUserSelectionChanged
{
  #keys: '[145730.1.19762112]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebDropDownList_OnUserSelectionChanged'
  Enabled: false
  QuillAction
  {
    Body:
    [*
      // (Software bug, dropdownlist cannot have response else enabled/disabled will not work)
      // Workaround (Quote RfC here): disabled all response, use DataHolderSelectedSP to source from this dropdownlist
      // and rely on OnDataChanged to replace DropDownList.OnUserChanged
      Form.ChangeOwner( selection );
    *]
    GroupServerCalls: false
  }
}
