Quintiq file version 2.0
#parent: PanelCapacity/RadioButtonGroupUsingOutputForCapacity
Response OnUserChanged () id:Response_PanelCapacity_RadioButtonGroupUsingOutputForCapacity_OnUserChanged
{
  #keys: '[158498.0.68062316]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebRadioButtonGroup_OnUserChanged'
  GroupServerCalls: true
  QuillAction
  {
    Body:
    [*
      // Update tooltip
      Form.UISetTooltip();
    *]
  }
}
