Quintiq file version 2.0
Component DashboardChartScenarioComparisonStockingPointCapacity id:DashboardChartScenarioComparisonStockingPointCapacity_545
{
  #keys: '[139394.0.2086158018]'
  BaseType: 'WebChart'
  Children:
  [
    Component DashboardChartLevelScenarioComparisonStockingPointCapacity
    {
      #keys: '[139394.0.2086158019]'
      BaseType: 'WebChartLevel'
      Children:
      [
        Component DataExtractorScenarioComparisonStockingPointCapacity
        {
          #keys: '[139394.0.2086158020]'
          BaseType: 'WebDataExtractor'
          Properties:
          [
            DataType: 'structured[StockingPointInPeriod]'
            Source: 'DataHolderScenarioComparisonSPIPs'
            Taborder: 0
            Transformation: 'Elements'
          ]
        }
        Component DashboardChartSeriesScenarioComparisonStockingPointCapacity
        {
          #keys: '[139394.0.2086158021]'
          BaseType: 'WebChartSeries'
          Properties:
          [
            Label: 'Utilization'
            Subtotal: 'average'
            Taborder: 1
            YScaleDataPath: 'object.InventoryLevel()'
          ]
        }
      ]
      Properties:
      [
        ChartColorString:
        [*
          WebChartColor
          {
            WebChartConfigGroup
            {
              Label: 'Series'
            }
            WebChartConfigGroup
            {
              Label: 'StockingPoint_MP.MacroPlan.ScenarioName'
              SequenceNr: 1
            }
            WebChartColorEntry
            {
              Label: 'Utilization'
              Color: 'Orange'
              Shape: 'Square'
              Size: 0
              Pattern: 'Solid'
            }
            WebChartColorEntry
            {
              Label: 'Max capacity'
              Color: '$FF0033'
              Shape: 'Square'
              Size: 0
              Pattern: 'Solid'
            }
            WebChartColorEntry
            {
              Label: 'Min capacity'
              Color: '$0099FF'
              Shape: 'Square'
              Size: 0
              Pattern: 'Solid'
            }
          }
        *]
        ChartTypeString:
        [*
          WebChartType
          {
            WebChartConfigGroup
            {
              Label: 'Series'
            }
            Default: 'Bar'
          }
        *]
        Groups: 'Period_MP.StartDate,StockingPoint_MP.MacroPlan.ScenarioName'
        Taborder: 0
      ]
    }
  ]
  Properties:
  [
    Taborder: 1
    Title: 'Stocking point capacity utilization'
    TitleYAxis: 'Utilization (%)'
  ]
  ResponseDefinitions:
  [
    DelegatedResponseDefinition OnClick id:Responsedef_DashboardChartScenarioComparisonStockingPointCapacity_545_WebMenu_OnClick
    {
      #keys: '[139394.0.2086158016]'
      Initiator: 'WebMenu'
      IsInherited: false
      ResponseType: 'OnClick'
    }
    DelegatedResponseDefinition OnClick id:Responsedef_DashboardChartScenarioComparisonStockingPointCapacity_545_WebButton_OnClick
    {
      #keys: '[139394.0.2086158017]'
      Initiator: 'WebButton'
      IsInherited: false
      ResponseType: 'OnClick'
    }
  ]
}
