Quintiq file version 2.0
#parent: vhPTFExecutionStatus
Response OnCreated () id:Response_LibPTF_pnlTestRunner_vhPTFExecutionStatus_OnCreated
{
  #keys: '[105690.0.892942528]'
  Body:
  [*
    // Stores the status of the current PTF execution
    // Possible values: 'Inactive', 'Running', 'Stopped', 'Waiting'
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIComponent_OnCreated'
}
