Quintiq file version 2.0
#parent: Toolbar
Response OnCreated () id:Response_Toolbar_OnCreated
{
  #keys: '[132254.0.39885901]'
  Body:
  [*
    // Hide the panel when there is no manager that can be outdated
    show := exists( Dialog.GetSanityCheckPanel().DataHolderSanityManagers().Data(), Elements, manager, manager.CanBeOutdated() );
    this.SetProperty( "Sizeable", true.AsQUILL() );
    this.SetProperty( "Size", ifexpr(show,30,0) );
    this.SetProperty( "Sizeable", false.AsQUILL() );
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIComponent_OnCreated'
}
