Quintiq file version 2.0
#parent: ListSanityCheckGroup
Response OnDrawElement (
  SanityCheckGroup element
) id:Response_ListSanityCheckGroup_OnDrawElement
{
  #keys: '[110880.8.552163622]'
  Body:
  [*
    // Draw an icon to indicate the view is no longer valid.
    // The view manager only accessible via client, thus we can only do it in the Designer.
    
    icon := '';
    
    if( not exists( ApplicationScope, ViewManager.GlobalCategories.AllViews, view,
                    view.Name() = element.View() ) )
    {
      icon := "WINDOW_WARNING";
    }
    
    drawinfo.Image( 0, icon );
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_List_OnDrawElement'
}
