Quintiq file version 2.0
#parent: pnlRecurring/ckbIsAllDayRecurring
Response OnUserChange () id:Response_pnlRecurring_ckbIsAllDayRecurring_OnUserChange
{
  #keys: '[131094.0.1376789284]'
  Body:
  [*
    // Keep ckbIsAllDay on the other panel in sync, so that switching between (not) recurring goes smoothly.
    ckbIsAllDay.Checked( this.Checked() );
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_CheckBox_OnUserChange'
}
