Quintiq file version 2.0
#root
#parent: KpiTrackerDesktop
OrphanComponent Kpi_frmKpiQueryCompare
{
  #keys: '[146874.0.1482141519]'
  Accessibility: 'Extensible'
  BaseType: 'Form'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 649 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => splQueryCompare
        Position { startcolumn: 649 startrow: 191 endcolumn: 649 endrow: 191 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 191 parent: 0 }
    ]
  }
  Children:
  [
    #child: splQueryCompare
  ]
  Properties:
  [
    Height: 559
    Image: 'SCALES'
    IncludeInView: true
    Title: 'KPI compare views'
    Width: 622
  ]
}
