Quintiq file version 2.0
#root
#parent: LibOpt_Desktop
OrphanComponent LibOpt_FormAnalysisScopeElement
{
  #keys: '[139164.4.121900237]'
  BaseType: 'Form'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 787 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => ListLibOpt_AnalysisScopeElement
        Position { startcolumn: 787 startrow: 541 endcolumn: 787 endrow: 541 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 541 parent: 0 }
    ]
  }
  Children:
  [
    #child: ListLibOpt_AnalysisScopeElement
    Component DataHolderComponents
    {
      #keys: '[139164.4.455539991]'
      BaseType: 'DataHolder'
      Databinding: 'structured[LibOpt_Component]*'
      Children:
      [
        Component GUIDataExtractor207
        {
          #keys: '[139164.4.455539992]'
          BaseType: 'GUIDataExtractor'
          Properties:
          [
            Component: 'LibOpt_FormComponentGraph.DataHolderSelected'
            DataType: 'structured[LibOpt_Component]'
            PosX: 30
            PosY: 60
            Transformation: 'Elements'
          ]
        }
      ]
      Properties:
      [
        PosX: 162
        PosY: 144
      ]
    }
  ]
  Properties:
  [
    Height: 325
    IncludeInView: true
    Title: 'Analysis scope elements'
    Width: 545
    ModeledStringList ChildOrdering
    {
      c: ListLibOpt_AnalysisScopeElement
      c: DataHolderComponents
    }
  ]
}
